1−10 1 10 )c (GeV/ Tp 8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 310 410 510 610

]^{-1})c

) [(GeV/ y d_Tp/(d N^2) d evN (1/

ALICE

= 5.02 TeV NNs Pb −Pb Uncertainties: stat. (bars), sys. (boxes)

= 5.02 TeV s pp

-π + ^+π

1 10 )c (GeV/ Tp

-1)c

) (GeV/ y d_Tp/(d

N^2 d_{ev}N 1/

11 0-5% x 2^{10}

5-10% x 2 9 10-20% x 2^8

20-30% x 2 7 30-40% x 2^6

40-50% x 2 5 50-60% x 2^4

60-70% x 2 3 70-80% x 2^2

80-90% x 2

- + K +K

1 10 )c (GeV/ Tp

-1)c

) (GeV/ y d_Tp/(d

N^2 d_{ev}N 1/

p p +